-- AlterTable
ALTER TABLE "Sus" ADD COLUMN     "active" BOOLEAN NOT NULL DEFAULT true,
ADD COLUMN     "time" TIMESTAMP(3) NOT NULL DEFAULT CURRENT_TIMESTAMP;
